0 20 40 60 80 0

0.05

0.1

0.15

0.2

0.25

0.3

0.35

10^0 10^1 10^2

10^{-4}

10^{-3}

10^{-2}

10^{-1}

10^0

The data is hard to see. A log-log scale is better

A good plot reveals a relationship in the data.